(GeV) s 210^310^410

(mb) SDσ

0

5

10

15

20

25 )^2c

<200 GeV/ XM ALICE ( )s <0.05 2 XM ALICE (extrapolated to )s <0.05 2 XM ISR ( )s <0.05 2 XM UA5 ( )s <0.05 2 XM UA4 ( )s <0.05 2 XM<^4c/^2

E710 (2 GeV